/*
 Navicat Premium Data Transfer

 Source Server         : localhost_3306
 Source Server Type    : MySQL
 Source Server Version : 50737
 Source Host           : localhost:3306
 Source Schema         : springboot-vue3

 Target Server Type    : MySQL
 Target Server Version : 50737
 File Encoding         : 65001

 Date: 24/06/2023 10:59:04
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for user
-- ----------------------------
DROP TABLE IF EXISTS `user`;
CREATE TABLE `user`  (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `name` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '姓名',
  `date` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '日期',
  `address` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '地址',
  `user_no` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NULL DEFAULT NULL COMMENT '编号',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 14 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_unicode_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of user
-- ----------------------------
INSERT INTO `user` VALUES (2, '张三', '2023-06-11', '安徽省合肥市', 'OKS12313');
INSERT INTO `user` VALUES (3, '青哥哥', '2023-06-12', '江苏省南京市', 'QA8546');
INSERT INTO `user` VALUES (4, '小黑子1', '2023-06-12', '江苏省南京市', 'WWD21');
INSERT INTO `user` VALUES (5, '小黑子2', '2023-06-12', '江苏省南京市', 'WWD21');
INSERT INTO `user` VALUES (6, '小黑子3', '2023-06-12', '江苏省南京市', 'WWD21');

SET FOREIGN_KEY_CHECKS = 1;
